<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">Určete hodnotu limit:
$$
\lim_{x \to \pi /3}\frac{\sin{(x - \pi /3 )}}{1 - 2\cos x},\qquad
\lim_{x \to 0}\frac{1 - \cos x}{x^2}, \qquad.
$$
</pre></body></html>